; STTubeDevice.def : Declares the module parameters for the DLL.

LIBRARY      "STTubeDevice30"
DESCRIPTION  'STTubeDevice Windows Dynamic Link Library'

EXPORTS
	STDevice_Open
	STDevice_OpenPipes
	STDevice_Close
	STDevice_ClosePipes
	STDevice_GetStringDescriptor
	STDevice_GetDeviceDescriptor
	STDevice_GetNbOfConfigurations
	STDevice_GetConfigurationDescriptor
	STDevice_GetNbOfInterfaces
	STDevice_GetNbOfAlternates
	STDevice_GetInterfaceDescriptor
	STDevice_GetNbOfEndPoints
	STDevice_GetEndPointDescriptor
	STDevice_GetNbOfDescriptors
	STDevice_GetDescriptor
	STDevice_SelectCurrentConfiguration
	STDevice_SetDefaultTimeOut
	STDevice_SetMaxNumInterruptInputBuffer
	STDevice_GetMaxNumInterruptInputBuffer
	STDevice_SetSuspendModeBehaviour
	STDevice_EndPointControl
	STDevice_Reset
	STDevice_ControlPipeRequest
	STDevice_Read
	STDevice_Write
